= KafkaHealthCheck
:icons: font

== Version 1.3.0

* Health check timeouts can now be configured in `java.time.Duration` format. The timeouts can still be configured using
  millisecond values (`long`) as well to stay compatible with old configurations.
* Dependency versions are now managed by `spring-boot-dependencies`.
  (https://github.com/deviceinsight/kafka-health-check/issues/17[ISSUE-17])
* As of now, cache metrics can be exposed. For this purpose, a corresponding MeterRegistry instance must be passed
  when instantiating the Kafka Health Check. (https://github.com/deviceinsight/kafka-health-check/issues/20[ISSUE-20])

== Version 1.2.0

* Reduce logging level of health check calls to `TRACE`.

== Version 1.1.0

* Make consumer groups unique by appending a random UUID when no group ID is configured explicitly.
* Refactor health check strategy: Kafka polled continuously.

== Version 1.0.0

* Develop kafka health check
