= KafkaHealthCheck
:icons: font

== Version 2.0.0

* Health check timeouts are configured in duration format.
If you changed the defaults, please adapt your configuration.

== Version 1.1.0

* Make consumer groups unique by appending a random UUID when no group ID is configured explicitly.
* Refactor health check strategy: Kafka polled continuously.

== Version 1.0.0

* Develop kafka health check
